200 400 600 800 1000 1200 1400 1600 1800 0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

0.9

1

Frequency, [Hz]

Absorption [-]

Melamine

α_{theo}, total α_{exp}, total α_{theo}, plane wave α_{exp}, plane wave